<template>
    <view-component :name="name" :code="code">
        <div class="py-6" slot="component">
            <section class="bg-white dark:bg-gray-800">
                <div class="container px-6 py-8 mx-auto">
                    <div class="sm:flex sm:items-center sm:justify-between">
                        <div>
                            <h2 class="text-3xl font-bold text-gray-800 dark:text-gray-100">Simple, transparent pricing</h2>
                            <p class="mt-4 text-gray-500 dark:text-gray-400">No Contracts. No surorise fees.</p>
                        </div>

                        <div class="overflow-hidden p-0.5 mt-6 border rounded-lg dark:border-gray-700">
                            <div class="sm:-mx-0.5 flex">
                                <button class=" focus:outline-none px-3 w-1/2 sm:w-auto py-1 sm:mx-0.5 text-white bg-blue-500 rounded-lg">Monthly</button>
                                <button class=" focus:outline-none px-3 w-1/2 sm:w-auto py-1 sm:mx-0.5 text-gray-800 dark:text-gray-200 dark:hover:bg-gray-700 bg-transparent rounded-lg hover:bg-gray-200">Yearly</button>
                            </div>
                        </div>
                    </div>

                    <div class="grid gap-6 mt-16 -mx-6 sm:gap-8 sm:grid-cols-2 lg:grid-cols-3 xl:grid-cols-4">
                        <div class="px-6 py-4 transition-colors duration-200 transform rounded-lg hover:bg-gray-200 dark:hover:bg-gray-700">
                            <p class="text-lg font-medium text-gray-800 dark:text-gray-100">Intro</p>
                            <h4 class="mt-2 text-4xl font-semibold text-gray-800 dark:text-gray-100">$19 <span class="text-base font-normal text-gray-600 dark:text-gray-400">/ Month</span></h4>
                            <p class="mt-4 text-gray-500 dark:text-gray-300">For most businesses that want to optimaize web queries.</p>

                            <div class="mt-8 space-y-8">
                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">All limited links</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Own analytics platform</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Chat support</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Optimize hashtags</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Unlimited users</span>
                                </div>
                            </div>

                            <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                                Choose plan
                            </button>
                        </div>

                        <div class="px-6 py-4 transition-colors duration-200 transform rounded-lg hover:bg-gray-200 dark:hover:bg-gray-700">
                            <p class="text-lg font-medium text-gray-800 dark:text-gray-100">Base</p>
                            <h4 class="mt-2 text-4xl font-semibold text-gray-800 dark:text-gray-100">$39 <span class="text-base font-normal text-gray-600 dark:text-gray-400">/ Month</span></h4>
                            <p class="mt-4 text-gray-500 dark:text-gray-300">For most businesses that want to optimaize web queries.</p>

                            <div class="mt-8 space-y-8">
                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">All limited links</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Own analytics platform</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Chat support</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Optimize hashtags</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Unlimited users</span>
                                </div>
                            </div>

                            <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                                Choose plan
                            </button>
                        </div>

                        <div class="px-6 py-4 transition-colors duration-200 transform bg-gray-700 rounded-lg dark:bg-gray-600">
                            <p class="text-lg font-medium text-gray-100">Popular</p>
                            <h4 class="mt-2 text-4xl font-semibold text-gray-100">$99 <span class="text-base font-normal text-gray-400">/ Month</span></h4>
                            <p class="mt-4 text-gray-300">For most businesses that want to optimaize web queries.</p>

                            <div class="mt-8 space-y-8">
                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-300">All limited links</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-300">Own analytics platform</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-300">Chat support</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-300">Optimize hashtags</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-300">Unlimited users</span>
                                </div>
                            </div>

                            <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                                Choose plan
                            </button>
                        </div>

                        <div class="px-6 py-4 transition-colors duration-200 transform rounded-lg hover:bg-gray-200 dark:hover:bg-gray-700">
                            <p class="text-lg font-medium text-gray-800 dark:text-gray-100">Exterprise</p>
                            <h4 class="mt-2 text-4xl font-semibold text-gray-800 dark:text-gray-100">$199 <span class="text-base font-normal text-gray-600 dark:text-gray-400">/ Month</span></h4>
                            <p class="mt-4 text-gray-500 dark:text-gray-300">For most businesses that want to optimaize web queries.</p>

                            <div class="mt-8 space-y-8">
                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">All limited links</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Own analytics platform</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Chat support</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Optimize hashtags</span>
                                </div>

                                <div class="flex items-center">
                                    <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                        <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                                    </svg>

                                    <span class="mx-4 text-gray-700 dark:text-gray-300">Unlimited users</span>
                                </div>
                            </div>

                            <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                                Choose plan
                            </button>
                        </div>
                    </div>
                </div>
            </section>
        </div>
    </view-component>
</template>

<script>
export default {
    data() {
        return {
            name: "Popular",
            code: `
    <section class="bg-white dark:bg-gray-800">
        <div class="container px-6 py-8 mx-auto">
            <div class="sm:flex sm:items-center sm:justify-between">
                <div>
                    <h2 class="text-3xl font-bold text-gray-800 dark:text-gray-100">Simple, transparent pricing</h2>
                    <p class="mt-4 text-gray-500 dark:text-gray-400">No Contracts. No surorise fees.</p>
                </div>

                <div class="overflow-hidden p-0.5 mt-6 border rounded-lg dark:border-gray-700">
                    <div class="sm:-mx-0.5 flex">
                        <button class=" focus:outline-none px-3 w-1/2 sm:w-auto py-1 sm:mx-0.5 text-white bg-blue-500 rounded-lg">Monthly</button>
                        <button class=" focus:outline-none px-3 w-1/2 sm:w-auto py-1 sm:mx-0.5 text-gray-800 dark:text-gray-200 dark:hover:bg-gray-700 bg-transparent rounded-lg hover:bg-gray-200">Yearly</button>
                    </div>
                </div>
            </div>

            <div class="grid gap-6 mt-16 -mx-6 sm:gap-8 sm:grid-cols-2 lg:grid-cols-3 xl:grid-cols-4">
                <div class="px-6 py-4 transition-colors duration-200 transform rounded-lg hover:bg-gray-200 dark:hover:bg-gray-700">
                    <p class="text-lg font-medium text-gray-800 dark:text-gray-100">Intro</p>
                    <h4 class="mt-2 text-4xl font-semibold text-gray-800 dark:text-gray-100">$19 <span class="text-base font-normal text-gray-600 dark:text-gray-400">/ Month</span></h4>
                    <p class="mt-4 text-gray-500 dark:text-gray-300">For most businesses that want to optimaize web queries.</p>

                    <div class="mt-8 space-y-8">
                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">All limited links</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Own analytics platform</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Chat support</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Optimize hashtags</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Unlimited users</span>
                        </div>
                    </div>

                    <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                        Choose plan
                    </button>
                </div>

                <div class="px-6 py-4 transition-colors duration-200 transform rounded-lg hover:bg-gray-200 dark:hover:bg-gray-700">
                    <p class="text-lg font-medium text-gray-800 dark:text-gray-100">Base</p>
                    <h4 class="mt-2 text-4xl font-semibold text-gray-800 dark:text-gray-100">$39 <span class="text-base font-normal text-gray-600 dark:text-gray-400">/ Month</span></h4>
                    <p class="mt-4 text-gray-500 dark:text-gray-300">For most businesses that want to optimaize web queries.</p>

                    <div class="mt-8 space-y-8">
                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">All limited links</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Own analytics platform</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Chat support</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Optimize hashtags</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Unlimited users</span>
                        </div>
                    </div>

                    <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                        Choose plan
                    </button>
                </div>

                <div class="px-6 py-4 transition-colors duration-200 transform bg-gray-700 rounded-lg dark:bg-gray-600">
                    <p class="text-lg font-medium text-gray-100">Popular</p>
                    <h4 class="mt-2 text-4xl font-semibold text-gray-100">$99 <span class="text-base font-normal text-gray-400">/ Month</span></h4>
                    <p class="mt-4 text-gray-300">For most businesses that want to optimaize web queries.</p>

                    <div class="mt-8 space-y-8">
                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-300">All limited links</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-300">Own analytics platform</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-300">Chat support</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-300">Optimize hashtags</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-300">Unlimited users</span>
                        </div>
                    </div>

                    <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                        Choose plan
                    </button>
                </div>

                <div class="px-6 py-4 transition-colors duration-200 transform rounded-lg hover:bg-gray-200 dark:hover:bg-gray-700">
                    <p class="text-lg font-medium text-gray-800 dark:text-gray-100">Exterprise</p>
                    <h4 class="mt-2 text-4xl font-semibold text-gray-800 dark:text-gray-100">$199 <span class="text-base font-normal text-gray-600 dark:text-gray-400">/ Month</span></h4>
                    <p class="mt-4 text-gray-500 dark:text-gray-300">For most businesses that want to optimaize web queries.</p>

                    <div class="mt-8 space-y-8">
                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">All limited links</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Own analytics platform</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Chat support</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Optimize hashtags</span>
                        </div>

                        <div class="flex items-center">
                            <svg xmlns="http://www.w3.org/2000/svg" class="w-5 h-5 text-blue-500" viewBox="0 0 20 20" fill="currentColor">
                                <path fill-rule="evenodd" d="M10 18a8 8 0 100-16 8 8 0 000 16zm3.707-9.293a1 1 0 00-1.414-1.414L9 10.586 7.707 9.293a1 1 0 00-1.414 1.414l2 2a1 1 0 001.414 0l4-4z" clip-rule="evenodd" />
                            </svg>

                            <span class="mx-4 text-gray-700 dark:text-gray-300">Unlimited users</span>
                        </div>
                    </div>

                    <button class="w-full px-4 py-2 mt-10 font-medium tracking-wide text-white capitalize transition-colors duration-200 transform bg-blue-500 rounded-md hover:bg-blue-600 focus:outline-none focus:bg-blue-600">
                        Choose plan
                    </button>
                </div>
            </div>
        </div>
    </section>`,
        };
    },
};
</script>
